/tmp/Slides/Fig.tex not found!
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
	pdflatex logfile: /tmp/Slides/Fig.log
	Return code:      256
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

001: This is pdfTeX, Version 3.14159265-2.6-1.40.17 (TeX Live 2016/Debian) (preloaded format=pdflatex)
002:  restricted \write18 enabled.
003: entering extended mode
004: ! I can't find file `/tmp/Slides/Fig.tex'.
005: <*> /tmp/Slides/Fig.tex
006:                        
007: (Press Enter to retry, or Control-D to exit)
008: Please type another input file name
009: ! Emergency stop.
010: <*> /tmp/Slides/Fig.tex
011:                        
012: !  ==> Fatal error occurred, no output PDF file produced!
013: Transcript written on /tmp/Slides/texput.log.
014: 
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
	Latex source file: /tmp/Slides/Fig.tex
	Return code:     256
	I think it starts here:     
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
#############################
	Latex source file: /tmp/Slides/Fig.tex
	No of lines/chars: 1, 0 chars
#############################
001: 
#############################
