/tmp/Slides/1-Fig.log not found!
/tmp/Slides/1-Fig.tex not found!
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
	pdflatex logfile: /tmp/Slides/1-Fig.log
	Return code:      256
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

001: 
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
	Latex source file: /tmp/Slides/1-Fig.tex
	Return code:     256
	I think it starts here:     
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
###############################
	Latex source file: /tmp/Slides/1-Fig.tex
	No of lines/chars: 1, 0 chars
###############################
001: 
###############################
