/tmp/Slides/Fig.log not found!
/tmp/Slides/Fig.tex not found!
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
	pdflatex logfile: /tmp/Slides/Fig.log
	Return code:      256
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

001: 
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
	Latex source file: /tmp/Slides/Fig.tex
	Return code:     256
	I think it starts here:     
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
#############################
	Latex source file: /tmp/Slides/Fig.tex
	No of lines/chars: 1, 0 chars
#############################
001: 
#############################
